LRHWW

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 500

1000

1500

2000

2500

LRHWW LRHWW__S Entries 49800 Mean 0.63 RMS 0.3153

LRHWW

LRHWW

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 2000

4000

6000

8000

10000

12000

14000

LRHWW LRHWW__B Entries 49800 Mean 0.2211 RMS 0.2662

LRHWW