NN Score

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 1.4

Normalized

0 1 2 3 4 5 6 7 8 9

0 1 2 3 4 5 6 7 8 9 Signal Background

MVA_H6AONN5MEMLP: Run20572Job410-160