-100 -80 -60 -40 -20 0 20 40 60 80 100

LRHWW

LRWW

LRWgLRWj

LRZZLepAEn

LepBEn addEtdPhiMetLJ dildphidilmass jet1_Etjet2_Et lepRmetmag metsigntightjets

LRHWW

LRWW

LRWg

LRWj

LRZZ

LepAEn

LepBEn addEt dPhiMetLJ dildphi dilmass jet1_Et jet2_Et lepR metmag metsig ntightjets

Correlation Matrix (signal)

10014 -19 27 -8 -6 -21 13 7 -18-18 -5 -3 -20 19 20 3

14100-46-29 5 6 25 37 -11 3 22 24 14 1 17 2 16

-19-46100-36 -8 -12-12-33 11 -3 -18-25-13 -2 -16 -3 -15

27 -29-36100 -5 -2 -15 9 0 10 13 -7 -4 11 7 8 -4

-8 5 -8 -5 10010 11 15 -5 4 12 16 5 4 0 -5 4

-6 6 -12 -2 1010021 31 -14 0 14 22 11 -1 -3 -13 14

-21 25 -12-15 11 2110015 -11 1 26 16 9 4 -8 -16 11

13 37 -33 9 15 31 15100 -3 -27 -5 50 25 -34 73 46 27

7 -11 11 0 -5 -14-11 -3 100-27-29-43-30-24 20 42 -50

-18 3 -3 10 4 0 1 -27-2710077 -16 -8 92 -34-34-12

-18 22 -18 13 12 14 26 -5 -29 77100 -1 0 85 -33-39 -1

-5 24 -25 -7 16 22 16 50 -43-16 -1 10044 -17 23 -15 71

-3 14 -13 -4 5 11 9 25 -30 -8 0 44100 -8 10 -13 71

-20 1 -2 11 4 -1 4 -34-24 92 85 -17 -8 100-37-34-12

19 17 -16 7 0 -3 -8 73 20 -34-33 23 10 -3710085 8

20 2 -3 8 -5 -13-16 46 42 -34-39-15-13-34 85100-24

3 16 -15 -4 4 14 11 27 -50-12 -1 71 71 -12 8 -24100 absolute values for correlation coefficients given in %