LRHWW

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Normalized

0 2000

4000

6000

8000

0

Signal Background

MVA input variable: LRHWW

LRWW

0 0.2 0.4 0.6 0.8 1

Normalized

0 1000

2000

3000

4000

5000

0

MVA input variable: LRWW

LRWg

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

Normalized

0 1000

2000

3000

4000

5000

6000

0

MVA input variable: LRWg

LRWj

-0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Normalized

0 200 400 600 800 1000

1200

1400

1600

0

MVA input variable: LRWj

LRZZ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

Normalized

0

5000

0

MVA input variable: LRZZ