anomalous coupling

-3 -2 -1 0 1 2 3 cross-section

150

200

250

300

350

/ ndf

2χ 0.1959 / 4 Prob 0.9955 p0 0.1734 ± 139.6 p1 0.106±

-3.917 p2 0.05044 ± 21.07 ± ±

/ ndf

2χ 0.1738 / 4 Prob 0.9964 p0 0.1588 ± 143.7 p1 0.09864 ± -5.203 p2 0.04593 ± 21.72 ± ± ± delta_g1(Z) vs x-sec@NLO for mcfm and bho