anomalous coupling

-3 -2 -1 0 1 2 3 cross-section

100 200 300 400 500 600 700 800 900

/ ndf

2χ 0.1131 / 4 Prob 0.9985 p0 0.2235 ± 139.6 p1 0.3147 ± -12.08 p2 0.1308 ± 76.88 ± ± ±

/ ndf

2χ 0.182 / 4 Prob 0.9961 p0 0.2063 ± 143.7 p1 0.3119 ± -13.53 p2 0.1277 ± 79.27 ± ± ± dkz vs x-sec@NLO for mcfm and bho