anomalous coupling

-3 -2 -1 0 1 2 3 cross-section

150 200 250 300 350 400 450

/ ndf

2χ 0.5954 / 4 Prob 0.9636 p0 0.1902 ± 139.5 p1 0.1493 ± -2.16 p2 0.06771 ± 31.05 ± ± ±

/ ndf

2χ 0.5365 / 4 Prob 0.9698 p0 0.1726 ± 143.8 p1 0.1417 ± -2.84 p2 0.06351 ± 31.39 ± ± ± lambda g vs x-sec@NLO for mcfm and bho