anomalous coupling

-3 -2 -1 0 1 2 3 cross-section

200 400 600 800 1000

1200

1400

/ ndf

2χ 0.01858 / 4 Prob 1 p0 0.2192 ± 139.6 p1 0.5565 ± 0.1792 p2 0.2257 ± 137.6 ± ± ±

/ ndf

2χ 0.02698 / 4 Prob 0.9999 p0 0.1963 ± 143.7 p1 0.5618 ± -1.804 p2 0.2261 ± 141.3 ± ± ± lambda Z vs x-sec@NLO for mcfm and bho