anomalous coupling

-3 -2 -1 0 1 2 3 cross-section

140 160 180 200 220 240 260 280 300 320

/ ndf

2χ 0.3992 / 4 Prob 0.9825 p0 0.1698 ± 139.5 p1 0.09822 ± -8.031 p2 0.04764 ± 17.13 ± ± ±

/ ndf

2χ 0.404 / 4 Prob 0.9822 p0 0.1527 ± 143.8 p1 0.08822 ± -8.656 p2 0.04236 ± 17.47 ± ± ± dkg vs x-sec@NLO for mcfm and bho