(rads) ηΔ 0 0.5 1 1.5 2 2.5 3 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

DeltaEta

MCFM LO MCFM NLO

(rads) ϕΔ 0 0.5 1 1.5 2 2.5 3 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

DeltaPhi

(R)(rads) Δ 0 1 2 3 4 5 6 0 0.01

0.02

0.03

0.04

0.05

0.06

DeltaR1