GeV/c

0 20 40 60 80 100120140160180200

eeM

0 50 100 150 200 250 300

ee → WW_{ZeeMass0}

Entries 11223 Mean 80.07 RMS 38.01

→ WW

GeV/c

0 50 100 150 200 250 300

μμM

0 50 100 150 200 250 300 350

μμ → WW_{ZmumMass0}

Entries 15099 Mean 82.64 RMS 46.13

→ WW