GeV/c

0 20 40 60 80 100120140160180200

eeM

0

200

400

600

800

1000 ee → WZ_{ZeeMass0}

Entries 4914 Mean 89.65 RMS 17.22

→ WZ

GeV/c

0 50 100 150 200 250 300

μμM

0

200

400

600

800

1000

1200 μμ → WZ_{ZmumMass0}

Entries 5923 Mean 88.92 RMS 18.47

→ WZ