TE 0 20 40 60 80 100 120 140

,closest l,jet) TE(_ϕΔ

0

0.5

1

1.5

2

2.5

3

3.5 =0 jets

ee N

→Z_{heeDphimljMetj0}

Entries 4196 Mean x 6.387 Mean y 0.7707 RMS x 4.94 RMS y 0.4879

→Z