ZeeMass0 Entries 9057 Mean 60.68 RMS 12.91

GeV/c

0 20 40 60 80100120140160180200

eeM

1

10

10^2

10^3 ττ→Z

ZmumMass0

Entries 12805 Mean 60.3 RMS 13.47

GeV/c

0 50 100 150 200 250 300

μμM

1

10

10^2

10^3

ττ→Z