0 0.2 0.4 0.6 0.8 1 1.2 0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

MVA_H6AONN5MEMLP_Train_S^{MVA_H6AONN5MEMLP_Train_S}

Entries 5382 Mean 0.7246 RMS 0.2085

Training Testing

MVA_H6AONN5MEMLP_Train_S

0 0.2 0.4 0.6 0.8 1 1.2 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

MVA_H6AONN5MEMLP_Train_B^{MVA_H6AONN5MEMLP_Train_B}

Entries 5382 Mean 0.2733 RMS 0.2806

MVA_H6AONN5MEMLP_Train_B