Njets[1 jet] (High S/B)

0 1 2 3 4 5 6 7

Data/MC

0.0

0.5

1.0

1.5

2.0

2.5

3.0

/DoF=1.3/1 2χ KS Prob = 1 -1 L=1.9fb ∫ CDF Run II Preliminary HWW =160_Hm