Higgs mass (GeV)

100 120 140 160 180 200

) (pb) (*) WW → BR(H ×σ

-1 10

1

10

210

Excluded at LEP

Standard Model

4th Generation Model

νlνl→^{(*)} WW →H 95% CL Limit Expected Observed

-1 DØ, 320 pb

→

1