Category Lepton ID Lep1 Isol Lep2 Isol Mℓℓ > 16 jet veto opp sign E̸t E̸t || Δϕ Mℓℓ < MH /2 p1p2 E̸t < MH

TCE-TCE 22638 18669 16786 15987 14051 14048 11235 11117 10871 10362 2.02 ± 0.01 82.47 ± 0.25 89.91 ± 0.22 95.24 ± 0.16 87.89 ± 0.26 99.98 ± 0.01 79.98 ± 0.34 98.95 ± 0.10 97.79 ± 0.14 95.32 ± 0.20 TCE-PHX 8087 7379 6971 6875 6146 5664 4602 4553 4314 4238 0.72 ± 0.01 91.25 ± 0.31 94.47 ± 0.27 98.62 ± 0.14 89.40 ± 0.37 92.16 ± 0.34 81.25 ± 0.52 98.94 ± 0.15 94.75 ± 0.33 98.24 ± 0.20 PHX-PHX 0 0 0 0 0 0 0 0 0 0 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 0.00 ± 0.00 ee 30725 26048 23757 22862 20197 19712 15837 15670 15185 14600 2.75 ± 0.02 84.78 ± 0.20 91.20 ± 0.18 96.23 ± 0.12 88.34 ± 0.21 97.60 ± 0.11 80.34 ± 0.28 98.95 ± 0.08 96.90 ± 0.14 96.15 ± 0.16 TCE-CMUP 28827 23920 22349 21200 18622 18619 14768 14619 14269 13667 2.58 ± 0.01 82.98 ± 0.22 93.43 ± 0.16 94.86 ± 0.15 87.84 ± 0.22 99.98 ± 0.01 79.32 ± 0.30 98.99 ± 0.08 97.61 ± 0.13 95.78 ± 0.17 TCE-CMX 12306 10338 9680 9296 8220 8217 6504 6446 6276 6061 1.10 ± 0.01 84.01 ± 0.33 93.64 ± 0.24 96.03 ± 0.20 88.43 ± 0.33 99.96 ± 0.02 79.15 ± 0.45 99.11 ± 0.12 97.36 ± 0.20 96.57 ± 0.23 TCE-CMU 4722 3935 3703 3594 3162 3162 2630 2598 2526 2413 0.42 ± 0.01 83.33 ± 0.54 94.10 ± 0.38 97.06 ± 0.28 87.98 ± 0.54 100.00 ± 0.00 83.18 ± 0.67 98.78 ± 0.21 97.23 ± 0.32 95.53 ± 0.41 TCE-CMP 6796 5736 5408 5236 4629 4629 3899 3860 3770 3598 0.61 ± 0.01 84.40 ± 0.44 94.28 ± 0.31 96.82 ± 0.24 88.41 ± 0.44 100.00 ± 0.00 84.23 ± 0.54 99.00 ± 0.16 97.67 ± 0.24 95.44 ± 0.34 TCE-CMIO 7719 6351 5931 5638 4955 4955 3867 3805 3722 3600 0.69 ± 0.01 82.28 ± 0.43 93.39 ± 0.31 95.06 ± 0.28 87.89 ± 0.43 100.00 ± 0.00 78.04 ± 0.59 98.40 ± 0.20 97.82 ± 0.24 96.72 ± 0.29 PHX-CMUP 3776 3538 3478 3477 3140 2902 2403 2372 2225 2212 0.34 ± 0.01 93.70 ± 0.40 98.30 ± 0.22 99.97 ± 0.03 90.31 ± 0.50 92.42 ± 0.47 82.80 ± 0.70 98.71 ± 0.23 93.80 ± 0.50 99.42 ± 0.16 PHX-CMX 3175 2918 2871 2794 2486 2253 1837 1812 1752 1701 0.28 ± 0.01 91.91 ± 0.48 98.39 ± 0.23 97.32 ± 0.30 88.98 ± 0.59 90.63 ± 0.58 81.54 ± 0.82 98.64 ± 0.27 96.69 ± 0.42 97.09 ± 0.40 PHX-CMU 865 822 815 813 723 670 583 580 550 541 0.08 ± 0.00 95.03 ± 0.74 99.15 ± 0.32 99.75 ± 0.17 88.93 ± 1.10 92.67 ± 0.97 87.01 ± 1.30 99.49 ± 0.30 94.83 ± 0.92 98.36 ± 0.54 PHX-CMP 863 810 805 805 724 672 591 582 542 542 0.08 ± 0.00 93.86 ± 0.82 99.38 ± 0.28 100.00 ± 0.00 89.94 ± 1.06 92.82 ± 0.96 87.95 ± 1.26 98.48 ± 0.50 93.13 ± 1.05 100.00 ± 0.00 PHX-CMIO 1741 1606 1580 1551 1383 1277 1074 1060 1004 983 0.16 ± 0.00 92.25 ± 0.64 98.38 ± 0.31 98.16 ± 0.34 89.17 ± 0.79 92.34 ± 0.72 84.10 ± 1.02 98.70 ± 0.35 94.72 ± 0.69 97.91 ± 0.45 eμ 70790 59974 56620 54404 48044 47356 38156 37734 36636 35318 6.33 ± 0.02 84.72 ± 0.14 94.41 ± 0.09 96.09 ± 0.08 88.31 ± 0.14 98.57 ± 0.05 80.57 ± 0.18 98.89 ± 0.05 97.09 ± 0.09 96.40 ± 0.10 CMUP-CMUP 9553 8390 7380 6932 6035 6035 4744 4691 4583 4389 0.85 ± 0.01 87.83 ± 0.33 87.96 ± 0.36 93.93 ± 0.28 87.06 ± 0.40 100.00 ± 0.00 78.61 ± 0.53 98.88 ± 0.15 97.70 ± 0.22 95.77 ± 0.30 CMUP-CMX 7410 6765 6467 6262 5533 5533 4432 4379 4266 4181 0.66 ± 0.01 91.30 ± 0.33 95.59 ± 0.25 96.83 ± 0.22 88.36 ± 0.41 100.00 ± 0.00 80.10 ± 0.54 98.80 ± 0.16 97.42 ± 0.24 98.01 ± 0.21 CMUP-CMU 3022 2750 2538 2475 2150 2150 1743 1729 1688 1636 0.27 ± 0.00 91.00 ± 0.52 92.29 ± 0.51 97.52 ± 0.31 86.87 ± 0.68 100.00 ± 0.00 81.07 ± 0.84 99.20 ± 0.21 97.63 ± 0.37 96.92 ± 0.42 CMUP-CMP 4826 4382 3796 3649 3201 3201 2626 2599 2547 2453 0.43 ± 0.01 90.80 ± 0.42 86.63 ± 0.51 96.13 ± 0.31 87.72 ± 0.54 100.00 ± 0.00 82.04 ± 0.68 98.97 ± 0.20 98.00 ± 0.27 96.31 ± 0.37 CMUP-CMIO 4973 4429 4129 3917 3455 3455 2696 2667 2608 2529 0.44 ± 0.01 89.06 ± 0.44 93.23 ± 0.38 94.87 ± 0.34 88.21 ± 0.52 100.00 ± 0.00 78.03 ± 0.70 98.92 ± 0.20 97.79 ± 0.28 96.97 ± 0.34 CMX-CMX 1738 1498 1177 1104 980 980 727 719 699 675 0.16 ± 0.00 86.19 ± 0.83 78.57 ± 1.06 93.80 ± 0.70 88.77 ± 0.95 100.00 ± 0.00 74.18 ± 1.40 98.90 ± 0.39 97.22 ± 0.61 96.57 ± 0.69 CMX-CMU 979 882 783 743 675 675 553 547 529 510 0.09 ± 0.00 90.09 ± 0.95 88.78 ± 1.06 94.89 ± 0.79 90.85 ± 1.06 100.00 ± 0.00 81.93 ± 1.48 98.92 ± 0.44 96.71 ± 0.76 96.41 ± 0.81 CMX-CMP 1443 1359 1308 1293 1118 1118 928 920 900 881 0.13 ± 0.00 94.18 ± 0.62 96.25 ± 0.52 98.85 ± 0.29 86.47 ± 0.95 100.00 ± 0.00 83.01 ± 1.12 99.14 ± 0.30 97.83 ± 0.48 97.89 ± 0.48 CMX-CMIO 1619 1459 1321 1270 1119 1119 834 826 795 772 0.14 ± 0.00 90.12 ± 0.74 90.54 ± 0.77 96.14 ± 0.53 88.11 ± 0.91 100.00 ± 0.00 74.53 ± 1.30 99.04 ± 0.34 96.25 ± 0.66 97.11 ± 0.59 μμ 35563 31914 28899 27645 24266 24266 19283 19077 18615 18026 3.18 ± 0.02 89.74 ± 0.16 90.55 ± 0.16 95.66 ± 0.12 87.78 ± 0.20 100.00 ± 0.00 79.47 ± 0.26 98.93 ± 0.07 97.58 ± 0.11 96.84 ± 0.13 total 137078 117936 109276 104911 92507 91334 73276 72481 70436 67944 12.25 ± 0.03 86.04 ± 0.09 92.66 ± 0.08 96.01 ± 0.06 88.18 ± 0.10 98.73 ± 0.04 80.23 ± 0.13 98.92 ± 0.04 97.18 ± 0.06 96.46 ± 0.07

Table 40: HW W dilepton MC acceptance table, assuming M^{SM}_H = 160 GeV