-0.2 -0.1 -0 0.1 0.2 0.3 0.4 1

10

10^2

10^3

10^4

CTau, Sidebands Entries 41770 Mean 0.006091 RMS 0.03008

Plot 200 Sum of Signal and Background in Mass Window