BeamTypeRun Entries 674118 Mean 1.446e+05 RMS 3743

1300 1350 1400 1450 1500 1550 1600 2 x10 0 5000

10000

15000

20000

25000

30000

35000

40000

BeamTypeRun_{Runs}

Entries 674118 Mean 1.448e+05 RMS 3694

1300 1350 1400 1450 1500 1550 1600 2 x10 0 5000

10000

15000

20000

25000

30000

35000

40000

45000

Runs

BeamTypeRun