Si1 Entries 674118 Mean 4.213 RMS 3.612

0 1 2 3 4 5 6 7 8 9 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 Si1_{Si2}

Entries 674118 Mean 4.066 RMS 3.61

0 1 2 3 4 5 6 7 8 9 10 0 200 400 600 800 1000

1200

1400

1600

1800

2000 2 x10 Si2 Si2