0 2 4 6 8 10 12 14 16 18 20 22

3.0925

3.093

3.0935

3.094

3.0945

JPsi Mass vs Pt

0 2 4 6 8 10 12 14 16 18 20 22

0.013

0.014

0.015

0.016

0.017

0.018

0.019

0.02

0.021

JPsi Width vs Pt

0 2 4 6 8 10 12 14 16 18 20 22 0

100

200

300

400

500 JPsi Background vs Pt